Product Guide

AERLITETM

AERLITE - iXTM

AQUAERiXTM

AERLITE foam liquid concentrate is a hybrid formula that takes the highest performing strength attirbutes of the protein products and combines them with the fluidity and flexibility found in the straight synthetic products. The AERLITE family of foaming agents, most commonly used in geotechnical applications, produces a lightweight cellular concrete when combined with a cement slurry.
AERLTE-iX is the new generation of foam technology. The fully synthetic foam liquid concentrate in the AERLITE family of foaming agents is engineered to produce a more flexible bubble structure which allows for extended pumping distances and increased lift heights.  AERLITE-iX is predominantly used in geotechnical construction applications.
AQUAERiX is an advanced, patented, synthetic foaming agent that utilizes an open-cell technology. AQUAERiX bubbles coalesce creating a capillary-like structure allowing water to pass through. When mixed with a cement slurry,  AQUAERiX produces a pervious lightweight cellular concrete used in geotechnical applications where increased drainage or reduced buoyancy force is important.

Wet Cast Density
20 pcf to 120 pcf

Compressive Strength
20 psi to 3,000 psi

Wet Cast Density
20 pcf to 50 pcf

Compressive Strength
50 psi to 500 psi

MEARLCRETETM

AERFLOW / AQUAFLOW

ARX-TRANSPORT

MEARLCRETE is a traditional protein based foam liquid concentrate. Foam technology using protein formulas has been around since the 1940’s. Protein formulas produce a rigid bubble structure which allows for higher compressive strengths but reduces lift heights and limits pumping distances. MEARLCRETE  has a UL rating and FM approvals, and is predominantly used in the roofing industry.
AERFLOW is a synthetic liquid foam concentrate formulated for the production of controlled low strength material (CLSM), more commonly known as flowable fill or flow fill. 3 oz of AERFLOW per cubic yard of finished concrete will increase the slump of the initial mix from 1.5 inches to 7-9 inches. Yields can be increased by 20-25%. A new pervious flow fill product,  AQUAFLOW is coming soon!
ARX-Transport is a synthetic liquid foam concentrate engineered to produce a pre-formed foam to transport solid materials such as mine tailings, crusher fines, or sand, either through a pipeline or for large void fill. Using foam technology as a transport medium dramatically reduces the amount of water needed to move materials compared to traditional methods, reducing dewatering.

Wet Cast Density
100 pcf to 120 pcf

Compressive Strength
50 psi to 200 psi

WWW.AERIXINDUSTRIES.COM

2013 Aerix IndustriesTM All Rights Reserved